(cm) xy DCA 2.5 - 2- 1.5

- 1- 0.5

- 0 0.5 1 1.5 2 2.5

Counts

1-10

1

10

210

310 410 d

| < 10 cm z |DCA | < 1 cm z |DCA

= 2.76 TeV NN s ALICE, Pb-Pb,